-- ATTACHMENT TABLE          (ID                                        , task_ID                                  , CREATED              , MODIFIED             , classif key, classif Id                                , refCompany, ref sys,   ref inst,ref type, ref val, channel,received, custAtts)

INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000000','TKI:000000000000000000000000000000000000', '2018-01-29 15:55:00', '2018-01-30 15:55:00', 'L1050'    , 'CLI:100000000000000000000000000000000003', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000001','TKI:000000000000000000000000000000000001', '2018-01-29 15:55:01', '2018-01-30 15:55:00', 'L10303'   , 'CLI:000000000000000000000000000000000002', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000002','TKI:000000000000000000000000000000000001', '2018-01-29 15:55:02', '2018-01-30 15:55:00', 'L1050'    , 'CLI:000000000000000000000000000000000003', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000003','TKI:000000000000000000000000000000000002', '2018-01-29 15:55:03', null                 , 'L11010'   , 'CLI:000000000000000000000000000000000004', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000004','TKI:000000000000000000000000000000000002', '2018-01-29 15:55:04', null                 , 'L110102'  , 'CLI:000000000000000000000000000000000005', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000005','TKI:000000000000000000000000000000000002', '2018-01-29 15:55:05', null                 , 'L110105'  , 'CLI:000000000000000000000000000000000006', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000006','TKI:000000000000000000000000000000000002', '2018-01-29 15:55:06', null                 , 'L110107'  , 'CLI:000000000000000000000000000000000007', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000007','TKI:000000000000000000000000000000000002', '2018-01-29 15:55:07', null                 , 'L12010'   , 'CLI:100000000000000000000000000000000008', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000008','TKI:000000000000000000000000000000000008', '2018-01-29 15:55:08', null                 , 'L140101'  , 'CLI:000000000000000000000000000000000009', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000009','TKI:000000000000000000000000000000000000', '2018-01-29 15:55:00', '2018-01-30 15:55:00', 'L1050'    , 'CLI:100000000000000000000000000000000003', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000010','TKI:000000000000000000000000000000000053', '2018-01-29 15:55:00', '2018-01-30 15:55:00', 'L1050'    , 'CLI:100000000000000000000000000000000003', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000011','TKI:000000000000000000000000000000000053', '2018-01-29 15:55:00', '2018-01-30 15:55:00', 'L1050'    , 'CLI:100000000000000000000000000000000003', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000012','TKI:000000000000000000000000000000000054', '2018-01-29 15:55:00', '2018-01-30 15:55:00', 'L1050'    , 'CLI:100000000000000000000000000000000003', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
INSERT INTO ATTACHMENT VALUES('TAI:000000000000000000000000000000000013','TKI:000000000000000000000000000000000055', '2018-01-29 15:55:00', '2018-01-30 15:55:00', 'L1050'    , 'CLI:100000000000000000000000000000000003', 'novatec' , 'novasys', 'nvinst', 'typ1', 'val1', 'ch1',  null, null);
